-- 创建数据源表
CREATE TABLE IF NOT EXISTS data_sources (
    id CHAR(36) PRIMARY KEY COMMENT '数据源ID',
    name VARCHAR(100) NOT NULL COMMENT '数据源名称',
    type VARCHAR(50) NOT NULL COMMENT '数据源类型: mysql/postgresql/mongodb/redis/csv/json/api/s3',
    description TEXT COMMENT '描述',
    config JSON NOT NULL COMMENT '连接配置（加密存储敏感信息）',
    status VARCHAR(20) DEFAULT 'active' COMMENT '状态: active/inactive/error',
    user_id CHAR(36) NOT NULL COMMENT '创建者ID',
    last_connected_at DATETIME COMMENT '最后连接时间',
    created_at DATETIME DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
    updated_at DATETIME DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
    FOREIGN KEY (user_id) REFERENCES users(id) ON DELETE CASCADE,
    INDEX idx_user_id (user_id),
    INDEX idx_type (type),
    INDEX idx_status (status)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='数据源表';
